---
title: "Custom Login Page"
description: "Configure a custom authentication page URL for your organization"
---

import PangolinCloudTocCta from "/snippets/pangolin-cloud-toc-cta.mdx";

<PangolinCloudTocCta />



<Note>
Custom auth pages are only available in [Pangolin Cloud](https://app.pangolin.net/auth/signup).
</Note>

Custom organization authentication pages let you serve the login page at your own domain instead of the default `app.pangolin.net`. This provides better user experience and brand consistency.

## Benefits

**For Resource Authentication:**
- Users are redirected to your custom domain for login
- Familiar domain builds trust and security awareness
- Consistent branding throughout the authentication flow

**For Identity Provider Integration:**
- Centralized login page for your organization
- Choose between multiple login methods (Google, Azure, etc.)
- Platform SSO: login once, access all Pangolin resources
- Direct access to the Pangolin management dashboard

<Frame>
  <img src="/images/org-auth-page.png" />
</Frame>

## Configuration

1. Go to **Settings** in your organization sidebar
2. Use the domain picker to select your custom domain
3. Save your changes

<Note>
You need to add a custom domain to your organization first. Free domains (`*.tunneled.to`, `*.hostlocal.app`, etc.) cannot be used for auth pages. [Learn how to add domains](/manage/domains#adding-domains)
</Note>

<Frame>
  <img src="/images/set-org-auth-page-domain.png" />
</Frame>
