---
title: "Custom Login Page"
description: "Configure a custom authentication page URL for your organization"
---

<Note>
Custom auth pages are only available in managed self-hosted nodes or in the cloud.
</Note>

Custom organization authentication pages let you serve the login page at your own domain instead of the default `pangolin.fossorial.io`. This provides better user experience and brand consistency.

<iframe
  className="w-full aspect-video rounded-xl"
  src="https://www.youtube.com/embed/fD-NpigE4Vw?si=M5BBiqoKRWSZNGU1"
  title="YouTube video player"
  frameBorder="0"
  allow="accelerometer; autoplay; clipboard-write; encrypted-media; gyroscope; picture-in-picture"
  allowFullScreen
></iframe>

## Benefits

**For Resource Authentication:**
- Users are redirected to your custom domain for login
- Familiar domain builds trust and security awareness
- Consistent branding throughout the authentication flow

**For Identity Provider Integration:**
- Centralized login page for your organization
- Choose between multiple login methods (Google, Azure, etc.)
- Platform SSO: login once, access all Pangolin resources
- Direct access to the Pangolin management dashboard

<Frame>
  <img src="/images/org-auth-page.png" />
</Frame>

## Configuration

1. Go to **Settings** in your organization sidebar
2. Use the domain picker to select your custom domain
3. Save your changes

<Note>
You need to add a custom domain to your organization first. Free domains (`*.tunneled.to`, `*.hostlocal.app`, etc.) cannot be used for auth pages. [Learn how to add domains](/manage/domains#adding-domains)
</Note>

<Frame>
  <img src="/images/set-org-auth-page-domain.png" />
</Frame>
