-- Insert default admin user
-- Password: Admin!234 (will be changed on first login)
INSERT INTO users (name, email, role, passhash, active, locale) VALUES 
('Administrator', 'admin@example.com', 'admin', '$argon2id$v=19$m=65536,t=4,p=1$dXNlcl9zYWx0$hashed_password_here', TRUE, 'de'),
('Max Mustermann', 'max.mustermann@example.com', 'auditor', '$argon2id$v=19$m=65536,t=4,p=1$dXNlcl9zYWx0$hashed_password_here', TRUE, 'de'),
('Anna Schmidt', 'anna.schmidt@example.com', 'employee', '$argon2id$v=19$m=65536,t=4,p=1$dXNlcl9zYWx0$hashed_password_here', TRUE, 'de');
